Free Distribution of the SyncCharts Software

1. The I3S Laboratory is letting ffl herafter referred to as the Beneficiary, have the free usage of the following software1

Name: syncCharts.

syncCharts is composed of the Tcl-Tk-based syncCharts editor/compiler and the associated parsers (without source code).

Origin:

ffl I3S Laboratory ffl Nice – Sophia Antipolis University ffl CNRS – UPRES-A 6070 This software will used exclusively on the following machine(s): ffl located at: ffl 1syncCharts is available for two systems (Check one box):

2 SUN4OS4 (but may run under Solaris 2, as well) 2 Linux

2. Maintenance of this software is by no way guaranteed. The Beneficiary will however be kept informed of the future releases.

3. The free disposal of syncCharts is intended for internal use for research and teaching purposes exclusively.

4. The beneficiary promises to forbid by all means both uses and copy of the syncCharts software outside his/her company or institution.

5. The code syncCharts should not be re-used without the written agreement of the author.

6. The Beneficiary agrees to acknowledge explicitly the name and origin of the software in any of his/her applications.

The Beneficiary, P/I3S Lab.

Caveats: The distribution does not include ffl Tcl-Tk that should be at least Tcl 7.6 and Tk 4.0, ffl the esterel environment (at least v5.01), ffl LATEX, dvips, tgrind, ffl c compilers ffl . . .

Please, return this form to

Charles ANDRE I3S Laboratory F - 06041 Nice cedex FRANCE

Fax: (33) 4 93 21 20 54